X-Git-Url: https://projects.mako.cc/source/selectricity-live/blobdiff_plain/c5fda1e5174238779afd496014379d6446d1e3c1..f7aee769411a893c1059c529a220c0d25c72974f:/db/create.sql?ds=inline

diff --git a/db/create.sql b/db/create.sql
index 2b32457..0b9b74e 100644
--- a/db/create.sql
+++ b/db/create.sql
@@ -89,3 +89,26 @@ create table rankings (
  primary key (id)
 );
 
+# CREATE users TABLE
+#####################################
+DROP TABLE IF EXISTS `users`;
+CREATE TABLE `users` (
+  `id` int(11) NOT NULL auto_increment,
+  `login` varchar(80) NOT NULL default '',
+  `salted_password` varchar(40) NOT NULL default '',
+  `email` varchar(60) NOT NULL default '',
+  `firstname` varchar(40) default NULL,
+  `lastname` varchar(40) default NULL,
+  `salt` varchar(40) NOT NULL default '',
+  `verified` int(11) default '0',
+  `role` varchar(40) default NULL,
+  `security_token` varchar(40) default NULL,
+  `token_expiry` datetime default NULL,
+  `created_at` datetime default NULL,
+  `updated_at` datetime default NULL,
+  `logged_in_at` datetime default NULL,
+  `deleted` int(11) default '0',
+  `delete_after` datetime default NULL,
+  PRIMARY KEY  (`id`)
+) ENGINE=InnoDB DEFAULT CHARSET=latin1;
+
