X-Git-Url: https://projects.mako.cc/source/selectricity-live/blobdiff_plain/afa6b59aed60497d059af87c049c0b4f1a6c8b6c..c65b1e11059c5cf510b54c785d4a246215058f70:/db/create.sql?ds=sidebyside

diff --git a/db/create.sql b/db/create.sql
old mode 100755
new mode 100644
