X-Git-Url: https://projects.mako.cc/source/selectricity-live/blobdiff_plain/67772df248fd417bc39cc1bb3940b94b4513fd1d..fc0a6a8d7ea15bcdb27ebdd58721401c7045c6e0:/db/create.sql?ds=sidebyside

diff --git a/db/create.sql b/db/create.sql
old mode 100644
new mode 100755
